From d70bcd848e394216d4b1ac0792010b1f2078233b Mon Sep 17 00:00:00 2001
From: Sarah Gosselin <sarah@gosselin.xyz>
Date: Wed, 4 Dec 2024 07:21:40 -0500
Subject: Fixing stuff along the way

---
 annexe/main.tex | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'annexe/main.tex')

diff --git a/annexe/main.tex b/annexe/main.tex
index 7fc9d85..cbb18e4 100644
--- a/annexe/main.tex
+++ b/annexe/main.tex
@@ -82,7 +82,7 @@
 \begin{appendix}
 	\section{Outils mathématiques (Bible)}
 	\label{sec:bible}
-	Les fonction suivantes seront utilisées et référencé tout au long de l'annexe.
+	Les fonction suivantes seront utilisées et référencées tout au long de l'annexe.
 
 	\begin{gather}
 		\vct = \frac{1}{C}\int\ict \dt \label{eq:vct}\\
@@ -96,7 +96,7 @@
 		\al = \frac{R}{2L} \label{eq:alpha}\\
 		\wz = \frac{1}{\sqrt{LC}} \label{eq:omega_0}\\
 		\omega_n = \sqrt{\ws  - \al^2 \label{eq:omega_n}} \\
-		e^{j\theta} = \cos(\theta) + j\sin(\theta) \label{eq:euler}
+		e^{j\theta} = \cos(\theta) + j\sin(\theta) \label{e:euler}
 	\end{gather}
 
 	\newpage
@@ -176,8 +176,8 @@
 			C_1\wn\sin(\wn t) - C_2\wn\cos(\wn t)\right] \label{eq:grosse-criss-de-derivee}
 	\end{gather}
 
-	Il est maintenant possible de trouver $C_1$ et $C_2$ en se servant de l'\cref{eq:vlh-sol-homo}
-	et de l'\cref{eq:grosse-criss-de-derivee}
+	Il est maintenant possible de trouver $C_1$ et $C_2$ en se servant des
+	conditions initiales présenté aux \cref{eq:vlh-sol-homo,eq:grosse-criss-de-derivee}
 	\begin{gather}
 		V_{L_h}(0) = 12 = \cancelto{1}{e^{-\al t}}\left[C_1\cancelto{1}{\cos(\wn t)} +
 			\cancelto{0}{C_2\sin(\wn t)}\right]\\
-- 
cgit v1.2.3


From 6b9306f60e35a283d8f7b77793ef6f99a55a78d5 Mon Sep 17 00:00:00 2001
From: Sarah Gosselin <sarah@gosselin.xyz>
Date: Wed, 4 Dec 2024 07:28:56 -0500
Subject: Having fun with arrows

---
 annexe/main.tex | 11 +++++------
 1 file changed, 5 insertions(+), 6 deletions(-)

(limited to 'annexe/main.tex')

diff --git a/annexe/main.tex b/annexe/main.tex
index d7c9130..e4e60b7 100644
--- a/annexe/main.tex
+++ b/annexe/main.tex
@@ -553,12 +553,11 @@
 
 	Apposons la contrainte que le condensateur doit être déchargé de $99.3\%$ de sa valeur
 	initiale après \SI{1}{\ms}:
-	\begin{gather*}
-		\begin{align}
-			(1-0.993)\rho                                              \\
-			\rho_1 = \SI{0.014}{\V}  ;\quad & \rho_2 = \SI{0.0385}{\V}
-		\end{align}
-	\end{gather*}
+	\begin{DispWithArrows}[format=c]
+		(1-0.993)\rho \Arrow{$\rho_1$}\Arrow[jump=2,xoffset=1cm]{$\rho_2$}\\
+		\sigma_1 = \SI{0.014}{\V} \\
+		\sigma_2 = \SI{0.0385}{\V}
+	\end{DispWithArrows}
 
 
 \end{appendix}
-- 
cgit v1.2.3

