From 8ba63379ad0175eca68c944d6d52139e15670be7 Mon Sep 17 00:00:00 2001
From: Benjamin Chausse <benjamin@chausse.xyz>
Date: Tue, 3 Dec 2024 06:49:37 -0500
Subject: plz sleep

---
 presentation/01-rlc.tex | 16 +++++++---------
 1 file changed, 7 insertions(+), 9 deletions(-)

(limited to 'presentation/01-rlc.tex')

diff --git a/presentation/01-rlc.tex b/presentation/01-rlc.tex
index a63189d..db29867 100644
--- a/presentation/01-rlc.tex
+++ b/presentation/01-rlc.tex
@@ -33,11 +33,13 @@
 	\begin{align}
 		V_\mathrm{in}(t) & = V_C(t) + V_R(t) + V_L(t)
 		\Rightarrow
-		V_\mathrm{in}^{\prime\prime}(t) = V_L^{\prime\prime}(t) + \frac{R}{L}V_L^{\prime}(t) + \frac{1}{LC}V_L(t) \\
+		V_\mathrm{in}^{\prime\prime}(t) = V_L^{\prime\prime}(t) +
+		\frac{R}{L}V_L^{\prime}(t) +
+		\frac{1}{LC}V_L(t)                                                                    \\
 		V_C(0)           & = 0;\quad
 		V_R(0) = 0;\quad
 		V_L(0) = 12;\quad
-		I(0) = 0;                                                                                                 \\
+		I(0) = 0;                                                                             \\
 		V_L(t)           & = \e^{-1000t} \left( 12\cos(8516.42t) - 1.41\sin(8516.42t) \right)
 	\end{align}
 \end{frame}
@@ -56,7 +58,7 @@
 
 		\begin{column}{0.5\textwidth}
 			\begin{figure}
-				\includegraphics[width=.9\textwidth]{figure/todo.jpg}
+				\includegraphics[width=.9\textwidth]{figure/tp12-dual.png}
 				\caption{Simulation du circuit RLC en charge}
 				\label{graph:lts-charge-rlc}
 			\end{figure}
@@ -64,7 +66,6 @@
 
 
 	\end{columns}
-	\todo{Graph LTspice charge RLC}
 \end{frame}
 
 \subsection{À la décharge}
@@ -102,7 +103,6 @@
 			\end{figure}
 		\end{column}
 	\end{columns}
-	\todo{Graph LTspice decharge RLC}
 \end{frame}
 
 \subsection{Résultats expérimentaux}
@@ -113,7 +113,7 @@
 		\begin{column}{0.5\textwidth}
 			\begin{figure}
 				\includegraphics[width=.9\textwidth]{figure/todo.jpg}
-				\caption{M.E.É. du circuit RLC en décharge}
+				\caption{Résultats expérimentaux de la charge}
 				\label{graph:osc-charge-rlc}
 			\end{figure}
 		\end{column}
@@ -121,14 +121,12 @@
 		\begin{column}{0.5\textwidth}
 			\begin{figure}
 				\includegraphics[width=.9\textwidth]{figure/todo.jpg}
-				\caption{Simulation du circuit RLC en décharge}
+				\caption{Résultats expérimentaux de la décharge}
 				\label{graph:osc-decharge-rlc}
 			\end{figure}
 		\end{column}
 
 
 	\end{columns}
-	\todo{Photos Osc. charge RLC}
-	\todo{Photos Osc. décharge RLC}
 \end{frame}
 %vim: ft=tex
-- 
cgit v1.2.3

